##base _IOBlixDevBase
##bias 42
##public
GetChipInfo(ioreq)(a0)
* the next two functions are only supported by ioblixpar and ioblix12par
* don't call them with other devices
AllocECPInfo(ioreq)(a0)
FreeECPInfo(info)(a0)
##end

